\documentclass[a4paper,11pt]{article}
\usepackage[top=1cm,bottom=2cm,left=1cm,right=1cm]{geometry}
\usepackage[T1]{fontenc}
\usepackage[utf8]{inputenc}
\usepackage{lmodern}
\usepackage{textgreek}
\usepackage{amsmath}
\usepackage{mathtools}
\usepackage{graphicx}
\usepackage{svg}
\usepackage{pdflscape}

\usepackage{tabularx}
\usepackage{blindtext}
\usepackage{hyperref}
\usepackage{pgfgantt}
\usepackage{colortbl}
\usepackage{pdfpages}
\usepackage{setspace}


\setcounter{tocdepth}{3}
\begin{document}
	\begin{titlepage}
		\newcommand{\HRule}{\rule{\linewidth}{0.5mm}}
		\center
		\textsc{\Large University College London}\\[0.5cm]
		\textsc{\large Department of Electronic \& Electrical Engineering}\\[0.5cm]
		
		\HRule \\[0.4cm]
		\setstretch{1.5}
		{ \huge \bfseries Project Interim Report}\\[0.4cm]
		\setstretch{1.0}
		\HRule \\[1.0cm]
		
		\Large \emph{Author:}\\
		Minduagas \textsc{Jarmolovicius}\\
		\href{mailto:zceemja@ucl.ac.uk}{zceemja@ucl.ac.uk}\\[0.5cm]
		
		\Large \emph{Supervisor:}\\
		Prof. Robert \textsc{Killey}\\
		\href{mailto:r.killey@ucl.ac.uk}{r.killey@ucl.ac.uk}
		\vfill
		{\large December 9, 2019}\\[2cm]
		
	\end{titlepage}
\pagebreak
\section{Abstract}
\section{Introduction}
\section{The Work Performed to Date}
\subsection{Project Scheduling}
\subsection{Supporting Theory}
\subsection{Progress to Date}
\section{Summary of Difficulties and Issues}
\subsection{List of Difficulties}
\subsection{Failure Assessment}
\subsection{Updated Safety Risk Assessment}
\section{Appendix A: Safety Risk Assessment}
\section{Appendix B: Computer Code}
\section{References}

\end{document}