\iffalse
This chapter describes your Goals and Objectives. 
Indicate how your work is intended to expand on previous historical work.
Present your motivations; why are you doing this?
Indicate the type of project you have(see the list above).

Types of Projects:
2) Design and Construction projects:
These types of projects involve the design and construction of some 
electrical or electronic apparatus or device within the bounds 
of the department's educational mandate.
\fi
