\iffalse
This chapter presents the background physical or electrical theory
and on any analytical methods you will use to accomplish your goals.
If you have a research question, what is it?
Have you made any deductions from it that you are now testing?
What mathematical bases must be understood in order to interpret your results in Chapter 5?
Give the reader a solid understanding of the foundations here.
\fi
